0 1 2 3 4 5

-1)c

(GeV/ Tp dy/d_ϕN^2d

3−10

2−10

1−10

1

10^{= 2.76 TeV, 0-40%} NNs ALICE Pb-Pb

Corr. syst. uncert. 3.7%

| < 0.5 y| < 4y

2.5 < 0.35 × Data Data EPOS 3 EPOS 3 HIJING 2 HIJING 2

0 1 2 3 4 5 1 2 3_{Data/EPOS}

(GeV/c) Tp 0 1 2 3 4 5 0 1 2 3 Data/HIJING

0 1 2 3 4 5

-1)c (GeV/

Tp dy/d_ϕN^2d

3−10

2−10

1−10

1

10 = 2.76 TeV, 40-90% NNs ALICE Pb-Pb

Corr. syst. uncert. 3.7%

| < 0.5 y| < 4y2.5 < 0.35 × Data Data EPOS 3 EPOS 3 HIJING 2 HIJING 2

0 1 2 3 4 5 1 2 3_{Data/EPOS}

(GeV/c) Tp 0 1 2 3 4 5 0 1 2 3 Data/HIJING